hist1[13]

Entries 1923 Mean 42.68 RMS 18.66

0 20 40 60 80 100 120 140 0

10

20

30

40

50 THETA (deg) itrk0

hist1[12]

Entries 1923 Mean 0.5994 RMS 0.2613

0 0.5 1 1.5 2 2.5 3 0

20

40

60

80

100

P (GeV) itrk0

hist1[15]

Entries 1923 Mean 1.235 RMS 9.28

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

20

40

60

80

100

120 Zv (cm) itrk0

hist1[14]

Entries 1923 Mean 175.6 RMS 105.6

0 50 100 150 200 250 300 350 0

5

10

15

20

25 PHI(deg) itrk0

hist1[158]

Entries 170 Mean 0.9412 RMS 12.66

-1000-800-600-400-200 0 200 400 600 8001000 0

20

40

60

80

100 Zv (cm) long range

hist1[16]

Entries 1923 Mean -0.05515 RMS 1.563

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

100

200

300

400

500 Yv (cm) itrk0

Download Prestart Go End Pause Resume 5^{6 7} Input from ... Change Client

CLAS

Previous View Next View

Road Finding (ON/OFF)

Track Fiting (ON/OFF)

Save Fitting